Paradox for Windows Local Settings
Local Settings Utility

Use the Local Settings program to change any of the following:

Working Directory

This is the directory containing the tables and objects with which you are currently working.

To change this directory, enter the entire path of the directory in which you want to work. You can also change this directory interactively.

Private Directory

In a multiuser environment, you need a place to put your temporary objects. Temporary tables (such as those created by a query) must be stored in a nonshared directory or they could be overwritten by other users. Every person who uses the tables on a network must have a private directory.

To change this directory, enter the entire path of your private directory. You can change this directory interactively.

IDAPI Configuration File

This is the directory containing your IDAPI configuration file.

To change this directory, enter the entire path of the .CFG file you want to use. This will update the [IDAPI] section of your WIN.INI file.