InterBase Connect Utility

Use the InterBase Connect Utility to verify your SQL Link connection to InterBase. To use the InterBase Connect Utility

1. Enter the full path to an InterBase database in the Database-Path text box. This must include the name of the server.

2. Enter your user name in the User Name text box.  This is the user name that is designated in the InterBase database isc.gdb.

3. Enter your password in the Password text box.

4. Click the Connect button.

If the connection is successful, the InterBase version ID for each link between your application and the database will appear in the list box.

If the connection is not successful, an error message will appear in the list box.

You can disconnect by clicking the Disconnect button or the Exit button.

When you close the InterBase Connect Utiltiy, your connection is automatically terminated.