
USAGE
     C[hat]

DESCRIPTION
     The chat command allows you to "talk" keyboard-to-keyboard with
     the operator of this NOS system. When you select this function,
     a new  window  will be  opened on the  operator's  console, and
     whatever  you type will be  visible  there.  If the operator is
     present, and types something in return, it will be sent back to
     you.

     When you wish to  terminate the chat session, type  the  escape
     character on your keyboard, and then press <ENTER> or <RETURN>.
     The default escape character is "CTRL-X",  which  means to hold
     down the <CTRL> key and press the <X> key simultaneously.  This
     escape character may be changed to whatever you prefer by using
     the "E[scape]" command.

EXAMPLES
     chat


